#-----------------------------------------------------------
#
#           Type <Repeater> EEPROM DATA EDITOR HELP FILE 
#                      Version 1.00
#
#         Copyright (c) 1991 by YAESU MUSEN Co., Ltd.
#
#-----------------------------------------------------------
# 
# Help File Format Information
# 
# Special characters at the beginning of each line determine
# the function of that line:
#       `#' = Comment line, ignored by program
#       `:' = Control line. the program looks for these
#             lines, and reads the following characters as a
#             help subject label. One special case is
#             ":page", which indicates a page break within a
#             help subject. 
# Maximum line length for help items is 61 chrs. Longer lines
# are truncated. Maximum number of lines/screen is 16
# (additional lines are automatically moved to the next
# screen).
# 
#-----------------------------------------------------------
#
:hc_hard
            [HARDWARE PARAMETERS]

 Environment (-p when booting program) From this screen you
 may enter/change IF frequency, channel step size, upper or
 lower carrier injection, and serial number.

 1st IF:
 enter 1st IF frequency according to repeater version
 (VHF=21.6 MHz, UHF 47.9 MHz), 

 Injection Side:
 select relationship between the 1st local oscillator
 frequency and receiving frequency. Changing injection
 side may reduce intermodulation experienced in some
 areas. Note: adjusting the injection side requires
 retuning. Normally the lower injection is selected.

 Channel Step:
 enter the appropriate channel step size as desired
 (10.0 kHz or 12.5 kHz)

 Serial Number:
 enter this number as printed on the identification label
 near the rear panel RX ANT jack.


:hc_freq
   [Edit Rx/Simplex Frequency & Hide/Unhide Repeater Data]

 Use 0 - 9 to enter the desired channel frequency, and press
 Enter. The frequency will be adjusted if it does not match
 the Repeater channel step size (as set in Environ Data),
 and will also appear in the Tx Freq field. You do not need
 to  enter all 8 digits: empty digits to the right are zero-
 filled.  Pressing [.] (period) after several digits forces
 them to MHz.  Press period first to change only kHz.

 NOTE! Any entries or changes to this field will also occur
       in the Tx Freq. field, so you may need to edit the TX
       field seperately after making any changes here.




 Arrow Keys: Change field (before or after editing 
                Frequency).
 0 - 9:      Input a digit.
 [.]:        Set last three (or fewer) digits as MHz, or
                next digits as kHz (if pressed first).
 Backspace:  Erase digit to the left, or cancel entry.
 Enter Key:  Accept displayed frequency, with zero-fill.
 Esc Key:    Cancel and return to previous frequency.

:hc_time
            [SYSTEM TIMER SELECTIONS]

 TIMER Three timer selections are available:
 RPTR Hang-Time Timer, Time-Out Timer and Guard-Timer.

 RPTR Hang-Time:
 This is only used for repeater operation. Determines the
 time delay the repeater will remain keyed after a stations
 input signal (carrier) drops. Hang-Time duration is entered
 in one-second increments (from 1-60 secs.) or disabled by
 toggling the SPACE bar.

 Time-Out Timer:
 This can be set to limit the total transmission time the
 repeater may remain keyed. The timer settings can be
 individually configured for remote base or repeater
 operation. Duration can be entered in 1-minute steps
 (1-60 mins.) or disabled by the SPACE bar.

 Guard Timer:
 Assigns a penalty time after the Time-Out timer has expired
 before an input signal will key the repeater again.
 Duration is entered in 10-second steps (from 10-secs.-360
 secs.). Individual guard-time duration can be entered for
 remote base and repeater operation. Must be set with Time-
 Out Timer enabled.

:hc_misc
             [MISC. SYSTEM SETTINGS]

 SETUP
 Five seperate operating modes can be configured from
 this screen:

 Mode:
 select simplex/duplex operation (remote base/repeater),
 when simplex mode is selected, repeater operation and
 associated functions are disabled.

 DC Low Power:
 selectable normal/reduced TX output power during battery
 power operation (low power extends battery life). Reduced
 TX output power level is adjustable in the ALIGNMENT mode


 HI TEMP Power Setting:
 when enabled, operation at reduced TX output power level
 is permitted when PA  HI-TEMP warning is received. After
 15 minutes of continued high-temperature operation, TX
 output is disabled. Operation at normal power may resume
 five minutes after the HI TEMP warning clears. When this
 option is disabled,TX power is cut immediately (no
 reduced power operation is possible) when a HI-TEMP alarm
 is received. TX is enabled again (normal power) 5-minutes
 after the HI TEMP alarm clears.

 Beep Setting (enabled/disabled) With the Time-Out Timer
 enabled, this beeper sounds 30 seconds before the transmit
 time expires. High-pitch beeps are used in the repeater
 mode, low-pitch beeps are for remote-base operation.

 Hang Timer Mute: (noise out/mute) With Mute enabled, channel
 noise is muted -20 dB for the duration of the carrier hang-
 time after input signal drops, else Noise Out selection
 permits incidental channel noise to be heard.

#
#
#
:hc_optn
 [Toggle Subaudible CTCSS Decoder, and set CTCSS frequency]

 Press the Space Bar to toggle the decoder on/off, or press
 Enter to display the Tone Selection window, from which you
 may select a frequency using the Arrow Keys (pressing Enter
 again to accept, or Esc to cancel).

 If you know the CTCSS frequency you want, you can enter it
 directly with the 0 - 9 and [.] (period) keys. When the
 desired CTCSS frequency is displayed, press Enter to accept.
 If the frequency was invalid (not among the standard tones),
 the Tone Select Window will appear as described above, with
 the nearest valid frequency pre-selected.

 Turning on CTCSS turns off DCS (both cannot be on).
 Turning off CTCSS also turns off BTLO (tone) if it was on.
#

 Arrow Keys: Change field, or select in Tone Select window.
 Space Bar:  Toggle Decoder on/off (except during selection).
 0 - 9, [.]: Direct tone frequency entry.
 Backspace:  Delete digit to left during direct entry.
 Enter Key:  Display Tone Select Window, and accept entry/
               selection.
 Esc Key:    Cancel input or selection.
#
#
#
:ha_strd
            [SYSTEM STATUS DISPLAY]

 STATUS: shows present repeater and  I/O port status.

:ha_adj
            [TX POWER ADJUSTMENT]

 ALIGNMENT: allows adjusting normal and low power output
 (battery operation) level. Use the F5/F6 function keys to
 raise/lower TX power.

:file_select
#
                   [File Selection Window]

 Select a filename (lower-case letters) or subdirectory
 (upper-case, in angle brackets <>) using the Arrow Keys, and
 then the Enter Key to accept your selection. If you selected
 a subdirectory, the window contents will be replaced with
 that subdirectory's contents, from which you can select
 again. You can also delete a file or subdirectory with [F4].

 You can also enter a new drive letter or filespec directly.
 Pressing alphanumeric keys activates the filespec line
 editor along the bottom of the window. You can use wildcards
 ("*" or "?") to display only certain files (eg.,
 :\CHDATA\*.CH and Enter displays only files with the "CH"
 extension in the CHDATA subdirectory on drive B). Tab
 returns you to the upper half of the selection window.
#
:page
#
         [EDITOR KEY FUNCTIONS]

 (at any time in Selection Window)
 Enter Key:  Accept selection.
 Esc Key:    Cancel operation and return to Repeater Editor.
 Tab Key:    Switch between Selection Window and line editor.

 (for selection in upper part of window)
 Arrow Keys: Select filename/subdirectory.
 Home/End:   Jump to first/last selection on screen.
 [F4] Key:   Delete current file selection from disk.
 PageDown:   Jump back one page (for large directories).
 PageUp:     Jump foward one page (for large directories).

 (for filespec editor at bottom of window)
 Delete:     Delete character under cursor.
 Backspace:  Delete character to left.
 Insert:     Toggle insert/overwrite modes.
#
#
#
:path_edit
#
                 [File Selection Window]

 Select a filename (lower-case letters) or subdirectory
 (upper-case, in angle brackets <>) using the Arrow Keys, and
 then the Enter Key to accept your selection. If you selected
 a subdirectory, the window contents will be replaced with
 that subdirectory's contents, from which you can select
 again.  If you select a file, you can delete it with [F4].

 You can also enter a new drive letter or filespec directly.
 Pressing alphanumeric keys activates the filespec line
 editor along the bottom of the window. You can use wildcards
 ("*" or "?") to display only certain files (eg.,
 B:\CHDATA\*.CH and Enter displays only files with the "CH"
 extension in the CHDATA subdirectory on drive B. Tab returns
 you to the upper half of the selection window.
#
:page
#
 (at any time in Selection Window)
 Enter Key:  Accept selection.
 Esc Key:    Cancel operation and return to Repeater Editor.
 Tab Key:    Switch between Selection Window and line editor.

 (for selection in upper part of window)
 Arrow Keys: Select filename/subdirectory.
 Home/End:   Jump to first/last selection on screen.
 [F4] Key:   Delete current file selection from disk.
 PageDown:   Jump down one page (for large directories).
 PageUp:     Jump up one page (for large directories).

 (for filespec editor at bottom of window)
 Delete:     Delete character under cursor.
 Backspace:  Delete character to left.
 Insert:     Toggle insert/overwrite modes.
#
#
#
:upload
#
     [Transfer data between PC and Repeater's EEPROM]

 The Space Bar is used to proceed with the transfer operation
 after ensuring the hardware is set up for the transfer. To
 cancel and return to the Repeater Editor, press the Esc Key
 instead.

 The status of the transfer operation will be displayed when
 finished (a few seconds after pressing the Space Bar).

 NOTE! Press the Esc Key if the system appears to hang. Then
 make sure the power indicator on the interface box is on,
 and check the cables for a connection problem.
#
#
#
:download
#
     [Transfer data between PC and Repeater's EEPROM]

 The Space Bar is used to proceed with the transfer operation
 after ensuring the hardware is set up for the transfer. To
 cancel and return to the Repeater Editor, press the Esc Key
 instead.

 The status of the transfer operation will be displayed when
 finished (a few seconds after pressing the Space Bar).

 NOTE! Press the Esc Key if the system appears to hang. Then
 make sure the power indicator on the interface box is on,
 and check the cables for a connection problem.
#
#
#
:make_dir
#
          [Make a new subdirectory on current Path]

 Input the name of the new subdirectory (up to 8 characters),
 then press Enter. Press Esc or F10 to cancel if you change
 your mind.

 Backspace: Delete character to left of cursor
 Delete:    Delete character above cursor
 Insert:    Toggle Insert/Overwrite mode (Insert is default,
	   Overwrite has block cursor)
#
#
#
:remove_dir
#
       [Remove the named (or pointed-to) subdirectory]

 Only empty daughter directories from the current subdirectory
 can be removed. In the file list, the inverse box can be
 positioned with the arrows to select a subdirectory to
 remove, by pressing F4. If the file list selection is not
 a subdirectory, a box will appear in which you can enter
 the name of the subdirectory to be removed. This name must
 be the same as one of the subdirectories displayed in the
 file list, and any files in that subdirectory must have
 already been deleted.

 Backspace: Delete character to left of cursor
 Delete:    Delete character above cursor
 Insert:    Toggle Insert/Overwrite mode (Insert is default,
	    Overwrite has block cursor)
