GP300/P110 Page 2
'
As you see in the  menu you can change splits in these radios, if you
do, don't try to program frequencies  that are more than about  7 Mhz
plus or minus from the original band.
'
If you go over 7 Mhz the vco may not start, and the radio is unusable.
Some radios can go more than 7 Mhz and some may not go more than 5 Mhz

'
If you experiment  and the vco does not start just reconvert the radio 
back to its original band split.
'
When converting  EURO  radios to  USA  standard this software does not 
convert 2.5Kc to 5Kc, this can be done in the RSS software by pressing
F2 for service then F2 for Alignment  Rx and Tx then F2 once again for
Level Set. In this menu you will see you can change the Deviation from
2.5 to 5 kc.


