Auto Configuration
'
The program  has detected  that no  configuration information exists
for this computer.
'
It will attempt to configure its self automatically, before pressing
a key to start make sure the following has been done.
'
1. Connect the MATH DEVICE  to one of your printer ports on the back
   of your computer.
'
2. Connect your RIB box to the computer as usual and turn it on.
'
3. Connect a GP300/P110 or Mobile to the RIB and turn it on, if pos-
   sible use a GP300, it will be much faster.
'
If you get an error  message this program may not be compatible with
your computer, try it again before giving up.
'
              Press any key for the configuration menu

