Bug Report
'
There maybe a bug here and there in the program due to the complex way
these radios are converted.  As new versions are released we will try 
to fix them.
'
P110 bug:
'
Trying to convert a 2 channel 2 watt P110 to a 4 watt GP300 will cause 
the RSS software not to update the wattage, also if you try to align 
the transmitter the test frequency shown will not be the frequency for 
that band.  The radio will still work fine.
'
This is not a bug but all ROM VERSION 1.00 GP300's are not supported and 
probably never will be.
'
The mobile quick convert works fine SOME of the time, it can still be 
used but if the radio bombs after conversion you will have to BLANK it 
and reconfigure with your RSS Software.
