Files
'
If you have used the  (S)=save option to read a radio you will see its
serial number on the screen, if the screen is full PRESS (P) to change 
pages, the directory is limited to 10 pages or 760 serial numbers.
'
The serial number will begin with a letter, (P) for a portable,(B) for 
a Maxtrac or M series, (H) for HT600/P200 or a (G) for a GM300.
'
This file reflects the radio BEFORE it was converted.  At any time you 
may recall the file and  reprogram  the radio to it's original config-
-uration.
'
DO NOT use the  (S) option to read a radio AFTER it has been converted
because  you will overwrite  the original  file and you will no longer 
be able to reprogram it to its original form. 
' 
This  module can be used to  CLONE any radio,   just save the original
then change the radios and recall the file then program the new one.

