Gp300/P110                                                      h2
'
All 2 or 8 channel GP300's can be converted to full 16 channels with
scan, vox and signalling.   You can just choose  1, 2, or 3  for the 
conversions or press (S) and scroll the available models.
'
When using (S) scroll, make sure the model chosen is within the range 
of the model to be converted.     You can change band splits one band 
higher or lower and go ABOUT  7 Mhz plus or minus without degradation.
'
The P100 4 channel  4 watt can be upgraded to a 16 channel GP300 with
no problems,    the 2 watt 2 channel can also be upgraded but it will
remain at  2 watts  and the  test frequency will not be the right one
when you come to tune it.
'
To upgrade a  2 watt P110  and have everything work, READ and SAVE a 
GP300  of the same band and then go to the  (F)  files menu and read
the file that was just saved,   then clone that file into your  P110
the radio may have to be retuned but you will have all features.
