General Help Version A1.60
'
This Program is simple to operate and no extra manuals should be needed
An extensive  collection of  help  screens are available throughout the 
program to guide you with most conversions.
'
When in doubt anywhere PRESS (H) for the help screen for that module.
'
Each Screen contains an explanation of the features of that module plus
any tips or problems which may be encountered.
'
This program is copy protected,  The  MATH  device that is installed in  
your printer port is the protection device and also serves as a storage 
medium for different parameters the program needs to operate. Please do
not tamper with this device as it contains CMOS devices and is fragile.
'
                            1 (819) 563-4533
'
 This product is protected by the copywrite laws of the US and Canada.

