   KPG-49D Help File  Version 3.00
   File name: KPG49D_5.HLP

2.00    May/08/1999    Add TK-980/981


S Switch Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see the programmable 
items. In the Key List window, select the item and then press [F1]
to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: None

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

A Switch Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see delete space the 
programmable items. In the Key List window, select the item and 
then press [F1] to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: None

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

B Switch Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see delete space the 
programmable items. In the Key List window, select the item and 
then press [F1] to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: None (Mobile)
         Channel Down (Portable;Conventional format)
         Group Down (Portable;Trunking format)

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

C Switch Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see delete space the 
programmable items. In the Key List window, select the item and 
then press [F1] to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: Channel Down (Mobile;Conventional format)
         Group Down (Mobile;Trunking format)
         Channel Up (Portable;Conventional format)
         Group Up (Portable;Trunking format)

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Monitor Switch Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see delete space the 
programmable items. In the Key List window, select the item and 
then press [F1] to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: Monitor A[Monitor Unmute(Momentary)]

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Lamp Switch Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see delete space the 
programmable items. In the Key List window, select the item and 
then press [F1] to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: Lamp

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

AUX Switch Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see delete space the 
programmable items. In the Key List window, select the item and 
then press [F1] to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: None

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Knob Select Help
Use this parameter to assign one of the key functions listed below to 
the transceiver knob.

System Up/Down : Turning the Knob changes systems Up or Down.
                 (Trunking format)
Group Up/Down  : Turning the Knob changes Groups Up or Down.
Channel Up/Down: Turning the Knob changes Channels Up or Down.
                 (Conventional format)
None           : No function is performed when the Knob is turned.
Default        : Group Up/Down (Conventional format)
                 System Up/Down (Trunking format)

Press [SPACE BAR] or [Shift]+[SPACE BAR] to change selection. Or, 
press [F2] for a list of available selections. Use the arrow keys to 
highlight the desired selection, then press [Enter]. Alternatively, 
enter the first letter (S, G, C, or N) of the desired setting.

Note 1:  Once the lowest/(highest) numbered system is reached, the 
         transceiver emits the Roll Over Tone. Turning the Knob past 
         the lowest/(highest) numbered system, changes to the highest/ 
         (lowest) numbered system.
Note 2:  Once the lowest/(highest) numbered group is reached, the 
         transceiver emits the Roll Over Tone. Turning the Knob past 
         the lowest/(highest) numbered group, changes to the highest/ 
         (lowest) numbered group.
Note 3:  If None is set, the Knob is still usable during DTMF Memory 
         operation (storage(STO) or call(RCL) mode).

DTMF Keypad Help
This parameter specifies whether the DTMF Keypad, required for setting 
functions, is attached to the transceiver.

Yes    : Functions can be set.
No     : Functions cannot be set.
Default: No

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Note:  For transceivers with no DTMF keypad, key functions will not 
       operate even if "Yes" is set and functions are assigned to the 
       [0] to [9], [#] and [*] keys.

Mic Switch Help
This setting assigns one of the key functions to the external 
microphone (optional) keys (PF1 and PF2).

Note:  If no external microphone is attached, key functions assigned 
       to these keys will not operate.

Function Switch Help
These settings are only possible when "DTMF Keypad" is set to "Yes".

For users who wish to use many key functions, the DTMF keypad is very 
useful. This parameter assigns one of the functions to each of the 
DTMF keypad keys ([0] to [9], [#] and [*]).

Note:  [Function] cannot be assigned to any of the DTMF keypad keys 
       ([0] to [9], [#] and [*]).

Scan Switch Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see delete space the 
programmable items. In the Key List window, select the item and 
then press [F1] to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: None

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

D Switch Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see  the programmable 
items. In the Key List window, select the item and then press [F1]
to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: Channel Up (Conventional format)
         Group Up (Trunking format)

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Volume Up Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see  the programmable 
items. In the Key List window, select the item and then press [F1]
to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: Volume Up

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Volume Down Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see delete space the 
programmable items. In the Key List window, select the item and 
then press [F1] to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: Volume Down

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

System Up Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see delete space the 
programmable items. In the Key List window, select the item and 
then press [F1] to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: System Up

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

System Down Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see delete space the 
programmable items. In the Key List window, select the item and 
then press [F1] to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: System Down

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Foot Switch Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see delete space the 
programmable items. In the Key List window, select the item and 
then press [F1] to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: None

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Group Up Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see  the programmable 
items. In the Key List window, select the item and then press [F1]
to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: Group Up

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Group Down Help
This is a programmable key.
Detail of programmable items:
Press [F2] to access the Key List window to see  the programmable 
items. In the Key List window, select the item and then press [F1]
to access the Help window to see the explanation.

Select the desired function from the Key List window by the arrow 
keys, then press enter.
Default: Group Down

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

[Auto Tel] Help
Pressing this key causes the transceiver to automatically start 
searching for an available RIC repeater starting from the currently 
selected system.  When an available repeater is found the transceiver 
links with the repeater and, if programmed with a telephone number 
(Store & Send/ Memory Dial), the transceiver automatically transmits a 
DTMF code to make a call.

Note 1:  The Revert system is included in the search list even when 
         programmed with "No" for "Auto TEL Search".
Note 2:  If the transceiver does not search for all systems, pressing 
         [Auto Tel] causes the transceiver to output a "Deny Tone"; 
         no operation is performed.
Note 3:  The RIC ID assigned to the lowest group number in the system 
         is used as the transmit ID for each system.
Note 4:  If no repeater is available in the system, or if RIC is 
         unable to link to a repeater in the system, the transceiver 
         will wait in that system for 5 seconds.
Note 5:  The transceiver searches for up to 60 seconds. If the 
         transceiver cannot find a repeater within this period, it 
         outputs a "Deny Tone" and quits searching.
Note 6:  Pressing [Auto Tel] while scanning stops Scan. The 
         transceiver resumes scanning when finished searching.
Note 7:  Pressing [Auto Tel] while the Auto Tel function is active 
         ("Queue Tone" sounding), cancels Auto Tel and returns the 
         transceiver to the previously selected system/group; a user 
         cannot cancel Auto Tel after establishing a link.

[AUX] Help
If this key is pressed once, an underscore ("_") appears at the 
extreme right of the transceiver display and the external logic port 
(OPT) becomes active (depending on "Access Logic Type" setting). 
If pressed again, the underscore turns off and the external logic port 
is reset.

Note:  If an optional board is installed in the radio,  this function 
       cannot be selected.
       (See Service Manual for details)

[AUX A] Help
If this key is pressed once, "AUX" icon appears on the LCD and
accessory port "Horn Alert Logic" goes Low.
If pressed again, "AUX" icon goes off and accessory port 
"Horn Alert Logic" goes Hi.
Refer "Off Hook Horn Alert" features.

Note:  If this function is active, Horn Alert function will not be
       active.
       (See Service Manual for details)

[AUX B] Help
If this key is pressed once, an underscore ("_") appears, at the 
extreme right of the transceiver display, external logic port (OP)
becomes active (depending on "Access Logic Type" setting.)
If pressed again, an underscore goes off and external logic port 
Is reset.

Note:  If an optional board is installed in the radio, this function 
       cannot be selected.
       (See Service Manual for details)

[Channel Down] Help
If this key is pressed once, the channels decrease by one step.
If this key is held down for 1sec, the channels decrease
continuously.

Note:  This key works as the "SCR code selector" in the Scrambler
       Code Select Mode.

[Channel Up] Help
If this key is pressed once, the channels increase by one step.
If this key is held down for 1sec, the channels increase
continuously.

Note:  This key works as the "SCR code selector" in the Scrambler
       Code Select Mode.

[DTMF ID (BOT)] Help
Pressing this key causes the transceiver to transmit the programmed 
DTMF ID (Begin of TX) code (16 digits max.) and, upon a match, causes
the repeater to open access.

[DTMF ID (EOT)] Help
Pressing this key causes the transceiver to transmit the programmed 
DTMF ID (End of TX) code (16 digits max.) and, upon a match, causes
the repeater to close access.

[Display Character] Help
[Conventional format]
Pressing this key switches between the "Channel Name" and "Grp#/Ch#"
for the display. When no channel name is programmed, the transceiver
automatically displays the group#/channel#.

[Trunking format]
Pressing this key switches between the "Group Name" and "Sys#/Grp#"
for the display. When no group name is programmed, the transceiver 
automatically displays the system#/group#.

[Emergency] Help
Pressing this key for longer than the programmed "Emergency Key Delay 
Time" causes the transceiver to enter the Emergency mode and display 
the "Emergency Display" setting.
The transceiver automatically switches to the "Emergency Group/Channel
(Conventional format) or System/Group (Trunking format)" and transmits 
for the programmed "Active Time".
The transceiver disables Mic Mute while transmitting.
After finishing transmission, the transceiver receives for the 
programmed "Interval Time".
The transceiver mutes the speaker while receiving.
Following the above sequence, the transceiver continues to transmit 
and receive.
While in Emergency mode, switch the power OFF or press [Emergency] 
for longer than the programmed "Emergency Key Delay Time" to exit 
Emergency mode.

Note 1:  This function can be assigned to only the AUX switch
         and PF1 (ORANGE) switch. (Portable)
Note 2:  This function can be assigned to only the Foot switch.
         (Mobile)

[Function] Help
Pressing this key causes the transceiver to display "FCN". Then, 
pressing a DTMF key causes the corresponding programmed function to 
start. Pressing this key again makes the transceiver restore the 
previous display. This key is convenient when using many 
functions with the 12-key keypad.

Note:  This function cannot be assigned to any DTMF key. 

[Group Down] Help
Pressing this key changes to the next lower numbered group. If the 
key is held down for more than 1sec, the group repeatedly changes 
every 200msec.
Once the minimum numbered group is reached, the transceiver emits the 
Roll Over Tone.  Pressing this key again, causes the group to wrap 
around to the highest numbered group.

[Group Up] Help
Pressing this key changes to the next higher numbered group. If the 
key is held down for more than 1sec, the group repeatedly changes
every 200msec.
Once the highest numbered group is reached, the transceiver wraps 
around to the minimum numbered group and emits the Roll Over Tone.

[Home Channel] Help
If this key is pressed once, the channel is switched to the
"Home Channel".

[Home Group] Help
If this key is pressed once, the group is switched to the
"Home Group".

[Horn Alert] Help
If this key is pressed, the Horn Alert function is activated and 
"HA" display appears on the LCD. 
This "HA" display appears a priority of other display function.

[Conventional format]
When the transceiver is called from base or other party using Option
signalling, the accessory ports HOR is connected. 
If pressed again, the Horn Alert function is canceled and the display 
returns to the normal user mode.
Refer "Off Hook Horn Alert" features.

Note:  The operator can not activate Horn Alert at the channel which
       has been set as "Option Signalling=OFF".

[Trunking format]
When the transceiver is called from base or other party using
signalling for Horn Alert function selected in a group, the
accessory ports HOR is connected.
If pressed again, the Horn Alert function is canceled and the display
returns to the normal user mode.
Refer "Off Hook Horn Alert" features.

[Key Lock] Help
Key Lock is used to prevent users from pressing incorrect keys which 
might cause a transceiver malfunction. 
If Key Lock is ON, the keys are disabled except PTT, Emergency, 
Function, Monitor A/B/C/D, Lamp (Portable), Volume control(Portable) 
and Volume Up/Down (Mobile).

Note 1:  Displays "-LOCKED-" for a moment when the locked key(s) is
         pressed, otherwise the display does not change while the key 
         Lock function is ON.
Note 2:  Switching the transceiver OFF then ON or pressing [Key Lock] 
         again cancels Key Lock.
Note 3:  Locked transceivers can still receive.
Note 4:  The locked keys also include the Tuning control.
Note 5:  Pressing this key while scanning causes the transceiver 
         to look, however, scanning continues ("SCAN" and "SCN" 
         stays lit).

[Lamp] Help
When pressed, the transceiver illuminates the display and keypad 
for 5 seconds.  
When pressed again, the transceiver stops illuminating. While 
illuminating, each time any key pressed or the Tuning control's  
turned, the transceiver continues illuminating for another 5 seconds.

[Memory(RCL/STO)] Help
This key allows DTMF memory data (with A/N) to be recalled or saved.  
Pressing this key displays "Memory RCL" and recalls the DTMF memory 
data. Pressing this key again while "Memory RCL" is visible causes 
the transceiver to display "Memory STO" and save DTMF memory data.  
Pressing this key once again while "Memory STO" is visible causes 
the transceiver to exit the Memory(RCL/STO) mode and restore the 
system/group (Trunking format) or group/channel (Conventional format) 
display. 

[Memory(RCL)] Help
This key allows DTMF memory data to be recalled; up to 32 memories 
each with a Memory Dial of up to 16 digits and an A/N of up to 10 
digits per memory.

[Conventional format]
1. Select a group/channel to transmit DTMF memory data, then press 
   this key. "Memory RCL" appear on the transceiver display.
2. Turn the Tuning control (Portable) or press the Group Up/Down key 
   (Mobile). The transceiver displays the memory name.
   If a memory name is not programmed, memory dialing data appears.
3. Select the desired memory channel by turning the Tuning control 
   (Portable) or press the Group Up/Down key (Mobile) or pressing [1] 
   to [9]. To see Redial numbers, press [0].
4. Press [PTT] to start transmission.  Pressing any key other than 
   [PTT], [Memory(RCL)], [Lamp], [Monitor], [RF Power Lo], and [0] to 
   [9] causes the transceiver to restore the group/channel display.
   * [Lamp] and [RF Power Lo] is only for portable.

[Trunking format]
1. Select a system/group to transmit DTMF memory data, then press this 
   key. "Memory RCL" appear on the transceiver display.
2. Turn the Tuning control (Portable) or press the System Up/Down key 
   (Mobile). The transceiver displays the memory name.
   If a memory name is not programmed, memory dialing data appears.
3. Select the desired memory channel by turning the Tuning control 
   (Portable) or press the System Up/Down key (Mobile) or pressing [1] 
   to [9]. To see Redial numbers, press [0].
4. Press [PTT] or [Auto Tel] to start transmission.  Pressing any key 
   other than [PTT], [Auto Tel], [Memory(RCL)], [Lamp], [Monitor],
   [RF Power Lo], and [0] to [9] causes the transceiver to restore 
   the system/group display.
   * [Lamp] and [RF Power Lo] is only for portable.
   * [Auto Tel] is only for Trunking format.

Note 1:  When transmitting 10 or more digits, the transceiver starts 
         scrolling from the first entered digit. When displaying the 
         last 10 digits, the transceiver stops scrolling.
Note 2:  Entering a non-programmed memory number causes the 
         transceiver to output an error tone; no operation is 
         performed.
Note 3:  When receiving a call while in the Memory(RCL) mode, the 
         transceiver exits the Memory(RCL) mode and restores the 
         system/group (Trunking format) or group/channel (Conventional 
         format) display. 
Note 4:  In Trunking format, on transceivers with no DTMF keypad
         another key must be used to assign "TEL Disconnect";
         otherwise, the telephone line cannot be disconnected.

[Memory(STO)] Help
This key allows DTMF Memory items to be stored; up to 32 memories with 
a Memory Dial of up to 16 digits and an A/N of up to 10 digits per 
memory.

[Conventional format]
1. When you press this key, "Memory STO" appear on the transceiver 
   display.
2. Turn the Tuning control (Portable) or press the Group Up/Down key 
   (Mobile). The transceiver displays the memory name. 
   If no memory has been programmed, "No Data" appears.
3. Select the location to which the data is to be written 
   (overwritten) by turning the Tuning control (Portable) or pressing 
   the Group Up/Down key (Mobile) or pressing [1] to [9], 
   then press [S](Portable)/[SCN](Mobile).
4. At this point, if data has already been entered for that memory 
   number, the "OverWr? Y/N" message appears.  To overwrite the data, 
   select "Y". Select "N" to exit the current mode.
5. Select a character by pressing [0] to [9], [#], or [*], or by 
   turning the Tuning control (Portable) or pressing the Group Up/Down 
   key (Mobile). When the desired character is displayed, press [A]. 
   The display moves to the next digit (up to 10 digits can be 
   entered for A/N). If no memory name is needed, skip this step.
6. When A/N input is complete, press [S](Portable)/[SCN](Mobile).
   The display is cleared and then changes to Memory Dial input.
7. Select a character by pressing [0] to [9], [#], or [*], or by 
   turning the Tuning control (Portable) or pressing the Group Up/Down 
   key (Mobile). When the desired character is displayed, press [A]. 
   The display moves to the next digit. Up to 16 digits can be 
   entered for Memory Dial.
8. When Memory Dial input is complete, press [S](Portable)/[SCN]
   (Mobile). "Store? Y/N" message appears.
   To store the memory item, select "Y" with the Tuning control
   (Portable) or the Group UP/Down key (Mobile), then press [S]
   (Portable)/[SCN](Mobile).
   To discard the currently specified data, select "N".

[Trunking format]
1. When you press this key, "Memory STO" appear on the transceiver 
   display.
2. Turn the Tuning control (Portable) or press the System Up/Down key 
   (Mobile). The transceiver displays the memory name. 
   If no memory has been programmed, "No Data" appears.
3. Select the location to which the data is to be written 
   (overwritten) by turning the Tuning control (Portable) or pressing 
   the System Up/Down key (Mobile) or pressing [1] to [9], 
   then press [S](Portable)/[SCN](Mobile).
4. At this point, if data has already been entered for that memory 
   number, the "OverWr? Y/N" message appears.  To overwrite the data, 
   select "Y". Select "N" to exit the current mode.
5. Select a character by pressing [0] to [9], [#], or [*], or by 
   turning the Tuning control (Portable) or pressing the System Up/ 
   Down key (Mobile). When the desired character is displayed, press 
   [A]. The display moves to the next digit (up to 10 digits can be 
   entered for A/N). If no memory name is needed, skip this step.
6. When A/N input is complete, press [S](Portable)/[SCN](Mobile).
   The display is cleared and then changes to Memory Dial input.
7. Select a character by pressing [0] to [9], [#], or [*], or by 
   turning the Tuning control (Portable) or pressing the System Up/ 
   Down key (Mobile). When the desired character is displayed, press 
   [A].  The display moves to the next digit. Up to 16 digits can be 
   entered for Memory Dial.
8. When Memory Dial input is complete, press [S](Portable)/[SCN]
   (Mobile). "Store? Y/N" message appears.
   To store the memory item, select "Y" with the Tuning control
   (Portable) or the System UP/Down key (Mobile), then press [S]
   (Portable)/[SCN](Mobile).
   To discard the currently specified data, select "N".

Note 1:  To delete the stored memory item, press [S](Portable)/[SCN]
         (Mobile) without entering any Memory Dial data for step 7,
         and then select "Y" when "Store? Y/N" is displayed in step 8.
Note 2:  Data can also be stored in memory using the FPU.
Note 3:  In this mode, the functions of the keys are fixed.
Note 4:  Switching the power off and on again exits this mode.
Note 5:  Only capital letters and numerals can be used as A/N.

[Monitor A] Help
While you are pressing this key, "MON" appears and Squelch unmutes 
regardless of the specified Signalling (including Option Signalling).
If you press this key while Option Signalling is matched, Option 
Signalling resets, and, upon releasing the key, Squelch mutes.  
Squelch remains muted until Option Signalling and/or Signalling 
matches (see "Edit/Dtmf/Decode Type").

Note 1:  In LTR system/groups of Trunking format, "MON" appears,
         however, only Option Signalling is reset (other than ID
         matching, Squelch does not unmute).
Note 2:  If you press this key while scanning, regardless of the 
         specified Signalling (including Option Signalling), "MON" 
         appears and scanning stops at the Conventional group 
         currently being scanned. When you release the key, "MON" 
         disappears and scanning restarts after the Drop Out Delay 
         Time.
Note 3:  D.B.D. mode is not reset by this operation.

[Monitor B] Help
When you press this key, "MON" appears and Squelch unmutes regardless 
of the specified Signalling (including Option Signalling).
If you press this key again, "MON" disappears and Squelch mutes.
If you press this key while Option Signalling is matched, Option 
Signalling resets, "MON" appears and Squelch unmutes.  If you press 
this key again, "MON" disappears and Squelch mutes.  Squelch remains 
muted until Option Signalling and/or Signalling matches (see "Edit/
Dtmf/Decode Type").

Note 1:  In LTR system/groups of Trunking format, "MON" appears but
         only Option Signalling is reset (other than ID matching, 
         Squelch does not unmute). If a system change shifts
         operation to a Conventional system, Squelch unmutes.
Note 2:  If you press this key while scanning, regardless of the 
         specified Signalling (including Option Signalling), "MON" 
         appears (Squelch unmutes) and scanning stops at the 
         Conventional group currently being scanned. If you press 
         the key again, "MON" disappears and scanning restarts after 
         the Drop Out Delay Time.
Note 3:  D.B.D. mode is not reset by this operation.

[Monitor C] Help
While you are pressing this key, "MON" appears and Squelch unmutes if 
a carrier is present, regardless of the specified Signalling 
(including Option Signalling).
If you press this key while Option Signalling is matched, Option 
Signalling resets, and, upon releasing the key, Squelch mutes.  
Squelch remains muted until Option Signalling and/or Signalling 
matches (see "Edit/Dtmf/Decode Type").

Note 1:  In LTR system/groups of Trunking format, "MON" appears but
         only Option Signalling is reset (other than ID matching,
         Squelch does not unmute).
Note 2:  If you press this key while scanning and if a carrier is 
         present, "MON" appears and scanning stops at the Conventional 
         group currently being scanned, regardless of the specified 
         Signalling (including Option Signalling). When you release 
         the key, "MON" disappears and scanning restarts after the 
         Drop Out Delay Time.
Note 3:  D.B.D. mode is not reset by this operation.

[Monitor D] Help
When you press this key, "MON" appears and Squelch unmutes if a 
carrier is present, regardless of the specified Signalling (including 
Option Signalling).
If you press this key again, "MON" disappears and Squelch mutes.
If you press this key while Option Signalling is matched, Option 
Signalling resets, "MON" appears and Squelch unmutes.  If you press 
this key again "MON" disappears and Squelch mutes.  Squelch remains 
muted until Option Signalling and/or Signalling matches (see "Edit/
Dtmf/Decode Type").

Note 1:  In LTR system/groups of Trunking format, only Option
         Signalling is reset (other than ID matching, Squelch does
         not unmute). At this point, if "MON" is displayed and 
         a system change shifts operation to a Conventional system,
         monitoring is performed. 
Note 2:  If you press this key while scanning and if a carrier is 
         present, "MON" appears and scanning stops at the Conventional 
         group currently being scanned, regardless of the specified 
         Signalling (including Option Signalling). If you press the 
         key again, or if the carrier drops out, "MON" disappears and 
         scanning restarts after the Drop Out Delay Time.
Note 3:  D.B.D. mode is not reset by this operation.

[Message Mode] Help
It can be assigned for [A] key only. There are 2 ways to use this key.
(See instruction manual for details) It is not available on old
firmware.
1) Pressing this key for a short time causes the transceiver to enter
   Message mode. During the mode, pressing this key changes a mode
   from Selcall mode to Status mode, then the radio exits Message
   mode.
2) Pressing and holding this key for 1 second causes the transceiver
   to enter Stack mode. During this mode, press this key to exit Stack
   mode.

Note: Even if this key is not assigned, a FleetSync call can be
      received and enter the Message Mode.

[Operator Selectable Tone] Help
This key switches the pre-set decode QT/DQT and encode QT/DQT to an
Operator Selectable Tone pair. 
When this key is pressed, the transceiver enters the "OST Select
Mode".
In this mode, the display shows the OST No. or OST Name which is 
set to the channel and the operator can select one of the OST Tone
pairs using the Group Up/Down key (Mobile), using the knob 
(Portable). If pressed again, the displayed OST code is memorized to 
the channel (when "OST Back Up" is set to "Enable"), the transceiver
exits from the OST Select Mode, returns to the normal Group-Channel 
display and shows the "OST" display.
If the operator sets the OST Tone pair to "OFF" (Select "OFF" using
the Group Up/Down key (Mobile), using the knob (Portable), and press 
this key), the OST function is canceled (The transceiver act on QT/DQT 
set by the KPG-49D) and the "OST" display goes off. 

Note1:  An OST Tone pair No. can be set for each channel.
Note2:  16 kinds of OST Tone pairs can be programmed
        in the Optional Features/Operator Selectable Tone window.
Note3:  While in the OST Select Mode, the transceiver does not
        look back at the priority channel in the scan resume mode.

[Public Address] Help
Public Address function can be programmed to a push key.
If this key is pressed, the Public Address function is activated and
the display shows "PUBLIC ADRS".
When you press PTT SW and talk into the microphone, your voice can be 
heard from the external speaker which is connected to the transceiver 
and no transmission occurs.
If pressed again, the Public Address function is canceled and the 
display returns to the normal user mode.

[Redial] Help
Press this key to send a previously sent DTMF (up to 16 digits).
When you press this key, the Redial number appears. If you press [PTT] 
while the Redial number is displayed, the DTMF code is output.  
Pressing this key during transmission sends the DTMF code immediately.

Note 1:  Switching the power off clears the storage buffer.
Note 2:  Performing a Programming Data Read/Write operation on the FPU 
         clears the Redial number.
Note 3:  In Trunking format, the ([#]) symbol in the RIC group is 
         the code used to cut a connection, so it is not stored in 
         Redial.

[RF Power Lo] Help
When you press this key, "LO" appears and the transceiver switches to
RF Low Power.
If you press this key while "LO" is displayed, the Power status 
reverts to the preset default setting. If "TX Power" is set to "Low"
(Low Power), no change occurs.

[Send GPS] Help
This functions manually send a single GPS location data message. 
A GPS receiver with NMEA0183 output must be installed and the GPS
settings must be done in the Edit-Data-GPS screen. Also, COM 1 port
must be set as "GPS".
[FleetSync Enhanced option]

[Scan] Help
Pressing this key starts/stops scanning. When you press this key, 
"Revert CH Display" is set to "Off", "SCN" and "-SCAN-" appear on the
transceiver display, and scanning begins. Pressing this key again,
stops scanning and the previous display appears.

Note:  This key does not operate while transmitting.

[Scan Del/Add] Help
[Conventional format]
Users can add or remove channels from the scan map.
If you press this key while the add mark "v" is displayed at the
extreme left of transceiver display, the add mark disappears and
the channel is deleted from the scan routine.

Note:  While in scan mode, this key works as a "Temporary Del/Add"
       function. When the transceiver exits from the scan mode, the 
       channel returns to the pre-set "Scan Del/Add" setting.

[Trunking format]
Users can add or remove (Lockout) a system from the scan map.
If you press this key while the delete mark ">" is displayed at the 
extreme left of the transceiver display (locked-out system), the 
delete mark disappears and the system is added to the scan routine.
If the delete mark is not displayed (unlocked system), pressing this 
key displays the delete mark and removes the system from the scan 
routine.

Note 1:  A system that Scan has temporarily stopped on, can be 
         deleted by pressing this key.
Note 2:  When data is written to the FPU, all settings are initialized 
         to Add (System Lockout = No).
Note 3:  Adding or deleting a system with this key takes precedence 
         over the FPU System Lockout settings.
Note 4:  This key operates even when "Scan Type" is set to 
         "List Type System Scan".

[Scan Temporary Delete] Help
Users can temporarily delete a system being scanned.
If you press this key when Scan is stopped (when a call is being 
received from another station), the system is temporarily deleted and 
scanning restarts.
The temporarily deleted system is not included in the scan routine 
until the Scan key pressed again or the Power is switched off and 
then on again.

Note 1:  When Scan or power is switched off and then on again, the 
         previous settings are restored.
Note 2:  This key operates even when "Scan Type" is set to 
         "List Type System Scan".

[Scrambler] Help
If a Scrambler Code [1 to 4](Portable)/[1 to 16](Mobile) has been set
in the FPU, an underscore ("_") appears at the extreme right of the
transceiver display when Scrambler is active.
If you press this key while the underscore is displayed, the
underscore disappears and Scrambler is deactivated.
If you press this key when no underscore is displayed, the underscore 
appears and Scrambler is activated.

If this key is held down for 2 sec, the transceiver enters the 
"Scrambler Code Select Mode".
[Conventional format]
The display shows "CODE **",and the operator can select the code 
which is programmed into the Scrambler Board using Channel Up, 
Channel Down, Group Up, Group Down or Knob select (Portable).

[Trunking format]
The display shows "CODE **",and the operator can select the code 
which is programmed into the Scrambler Board using System Up, 
System Down, Group Up, Group Down or Knob select (Portable).

Note:  If you press this key when the Scrambler Code is set to off 
       in the FPU and no underscore is displayed, the underscore 
       does not appear on the transceiver display and Scrambler 
       remains deactivated.

[SP Attenuation] Help
If this key is pressed once, the volume level of the
speaker-microphone is decreased approx. 10dB.
If pressed again, the volume returns to the previous level.

Note: Beep tones will be reduced by pressing the [SP Mic Attenuation]
      key, regardless of their level setting.

[System Down] Help
Pressing this key changes to the next lower numbered system. If the 
key is held down for more than 1sec, the system repeatedly changes 
every 200msec.
Once the minimum numbered system is reached, the transceiver emits the 
Roll Over Tone.  Pressing this key again, causes the system to wrap 
around to the highest numbered system.

[System Up] Help
Pressing this key changes to the next higher numbered system. If the 
key is held down for more than 1sec, the system repeatedly changes 
every 200msec.
Once the highest numbered system is reached, the transceiver wraps 
around to the minimum numbered system and emits the Roll Over Tone.

[Talk Around] Help
The transceiver transmits on the receive frequency and QT/DQT code.
When this key is pressed, "TA" appears on the LCD.

[TEL Disconnect] Help
Pressing this key ends an RIC connection (disconnects the telephone 
line).

Note:  On transceivers with no keypad, this function must always be 
       assigned to another key so that the telephone line can be 
       disconnected.

[Volume Down] Help
Pressing this key decreases the volume level by one step.
Holding this key down causes the function to repeat.

[Volume Up] Help
Pressing this key increases the volume level by one step.
Holding this key down causes the function to repeat.

[None] Help
When you press this key, the transceiver emits the "Key Input Error
Tone" (no function is performed).

Note:  If "Optional features/Control Tone" is set to "No", the 
       transceiver does not emit a "Key Input Error Tone".

[Channel Up/Down] Help
Turning the knob changes the Channel up or down.

Note 1:  This knob works as the "OST number selector" in the Operator
         Selectable Tone Select Mode.
Note 2:  This knob works as the "SCR code selector" in the Scrambler
         Code Select Mode.

[Group Up/Down] Help
Turning the knob changes the Group up or down.

Note 1:  This knob works as the "OST number selector" in the Operator
         Selectable Tone Select Mode. (Conventional format)
Note 2:  This knob works as the "SCR code selector" in the Scrambler
         Code Select Mode.

[System Up/Down] Help
Turning the knob changes the System up or down.

Note:  This knob works as the "SCR code selector" in the Scrambler
       Code Select Mode.

Priority Help
Select the Priority channel.

None    : No Priority channel
Fixed   : Priority channel is a fixed channel.
          Set that channel in the Channel Information screen.
          Move the cursor to the desired channel in the Channel 
          Information screen, then press F10 and set 
          "Priority Channel" to "On" in Channel Edit.
Selected: The Selected channel becomes Priority.
Default : None

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Look Back Time A Help
[Conventional format]
When a Priority channel is set, if the channel from which a call is
received during a Single scan or Multi scan is not a Priority channel,
the transceiver still checks for calls from the Priority channel at
set intervals while scanning is stopped.
This operation is called Look Back. Look Back Time A is the interval 
at which Look Back operates while no carrier is being received on the 
Priority channel.

[Trunking format]
When a Priority group is set in a Conventional system, if the group 
from which a call is received during a group scan (including a group 
scan that is part of a system scan) is not a Priority group, the 
transceiver still checks for calls from the Priority group at set 
intervals while scanning is stopped.
This operation is called Look Back. Look Back Time A is the interval 
at which Look Back operates while no carrier is being received on the 
Priority group.
Look Back does not operate during Trunking system reception.

Range  : 0.35 to 5.00 sec. (0.05 sec. steps)
Default: 0.50 sec.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+ [F2], or by directly entering a value.

Note:  Look Back does not operate during Trunking system reception.

Look Back Time B Help
[Conventional format]
Look Back Time B is the interval at which Look Back operates while a
carrier is being received on the Priority channel but Signalling is
unmatched.

[Trunking format]
Look Back Time B is the interval at which Look Back operates while a
carrier is being received on the Priority group but Signalling is
unmatched.
Look Back does not operate during Trunking system reception.

Range  : 0.50 to 5.00 sec. (0.05 sec. steps)
Default: 2.00 sec.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+ [F2], or by directly entering a value.

Revert Channel Help
In scan mode the transceiver can be programmed to revert
to a certain channel upon PTT.
This allows the transceiver to be customized to the users transmission
requirements while using scan. 
The revert channel types are Last Called, Last Used,
Selected plus Talkback, Priority, Priority plus Talkback,
and Selected.
In all cases the user has the capability to manually select a channel
for transmission.
(this resets the revert to the selected channel)

Last Called :
 The transceiver reverts to the channel upon which a call was last 
 received even if scanning has resumed (power on default = selected 
 channel).
 This is convenient for users that may commonly receive calls on 
 several channels and desire the transceiver to always respond on
 the last call received (especially if the user is not normally able 
 to respond immediately before scan resumes).

Last Used : ( = with Talkback)
 The transceiver reverts to the channel that was last transmitted on 
 (power on default = selected channel), however, if a call is received 
 on a channel other than the last transmit channel and PTT is pressed 
 before scanning resumes, the transceiver "talks back" on the current 
 receive channel (scan resume time is dependent on the Dropout Delay 
 and TX Dwell time settings).
 If PTT is pressed after scan resumes, the transceiver will transmit 
 on the last transmit channel.
 This is convenient for users that always want to transmit on the 
 channel they are currently using and do not want the revert channel 
 to be constantly changed by other channel traffic, but need to 
 immediately respond to calls on any other channel without having to 
 determine which channel the call was received on and then manually 
 switch to that channel.

Selected+Talkback :
 The transceiver reverts to the channel set by the channel selector 
 knob prior to scan initiation, however, if a call is received on a 
 channel other than the selected channel and PTT is pressed before 
 scanning resumes, the transceiver "talks back" on the current receive 
 channel (scan resume time is dependent on the Dropout Delay and TX 
 Dwell Time settings).
 If PTT is pressed after scan resumes, the transceiver will transmit 
 on the selected channel.
 This is convenient for users who normally want to transmit on the 
 selected channel, but need to immediately respond to calls on any 
 other channel without having to determine which channel the call was
 received on and then manually switch to that channel.

Priority :
 The transceiver always reverts to the Priority channel.
 This is convenient for users that almost always need to transmit on 
 the Priority channel.

Priority+Talkback :
 The transceiver always reverts to the Priority channel, however, if a 
 call is received on a channel other than the Priority channel and PTT 
 is pressed before scanning resumes, the transceiver "talks back" on 
 the current receive channel (scan resume time is dependent on the 
 Dropout Delay and TX Dwell Time settings).
 If PTT is pressed after scan resumes, the transceiver will transmit 
 on the Priority channel.
 This is convenient for users that almost always need to transmit on 
 the Priority channel, but need to immediately respond to calls on any 
 other channel without having to determine which channel the call was 
 received on and then manually switch to that channel.

Selected :
 The transceiver reverts to the channel set by the channel selector 
 knob prior to scan initiation.

Default  : Last Called

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Dropout Delay Time Help
Drop Out Delay Time is the time from the end of a received call to the 
time scanning automatically resumes.

Range  : 0 to 300 sec. (1 sec. steps)
Default: 3 sec.

Note   : To receive DTMF Selective/Group Call or Dead Beat Disable,
         the Dropout Delay Time needs to be set for sufficient time.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+ [F2], or by directly entering a value.

Dwell Time Help
Dwell Time is the time from the end of transmission to the time 
scanning automatically resumes.

Range  : 0 to 300 sec. (1 sec. steps)
Default: 3 sec.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+ [F2], or by directly entering a value.

Group Scan Help
Select the Scan group range.

Single : The scan sequence range is the one group of the currently
         displayed channel.
Multi  : The scan sequence range is all groups, except deleted groups.
Default: Single

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Revert CH Display Help
Select Display in the scan mode.

On     : The transceiver indicates the revert channel on the channel 
         display in the scan mode.
Off    : The transceiver indicates "-SCAN-" on the channel display 
         in the scan mode.
Default: Off

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Off Hook Scan Help
The RADIO is able to scan even though the microphone is in the off
hook condition.

Enable : Scanning is not controlled by microphone hook 
         status.
         Radio always scans, and stops only by signal presence.
Disable: Microphone must be on hook for scanning.
Default: Disable.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Scan Type Help
This parameter specifies the system Scan Type.

Fixed System Scan:
 After the current system (the Revert system when scanning starts) is 
 scanned, the transceiver starts scanning the next system that is not 
 locked out ("System Lockout = No").
 If no call is found within a set interval, the transceiver continues 
 to the next added system.  
 The systems for which "System Lockout" is set to "Yes" are not 
 scanned.
 A group Scan is performed for systems with groups that have group 
 lockout set to "No".

Note:  System Lockout cannot be set for each system unless "Fix 
       System Scan " is selected for this parameter.
       "Scan List" is used instead of "System Lockout" when "Edit/Scan 
       information/Scan Type" is set to "List Type System Scan".

List Type System Scan:
 After the transceiver scans the current system (the Revert system 
 when scanning starts), Scan proceeds in accordance with the "System 
 Scan List" of the Revert system. A group scan is performed for each 
 system.

Note:  A Scan List cannot be created for each system unless "List 
       Type System Scan" is selected for this parameter.
       "System Lockout" is used instead of "Scan List" when "Edit/Scan 
       information/Scan Type" is set to "Fix System Scan".

Default : Fixed System Scan

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

[Operation in the LTR System]
Squelch mutes/unmutes according to the Priority (Fix ID 1st/Fix ID 
2nd, etc.) set using the LTR ID you assign for each system.
Look Back in a Conventional Priority system/group does not operate 
while scanning is stopped in a LTR system.

[Operation in the Conventional System]
Squelch mutes/unmutes according to the matching or unmatching of 
Signalling (QT/DQT) and the frequency of each group.
If scan is temporarily stopped (during signal reception or Drop Out 
Delay), Look Back to the Priority group operates when a Priority group 
is set for the system.
However, while receiving a Priority group ("P" displayed), Look Back 
does not operate. Look Back operates in accordance with Look Back A 
and B settings. If a Priority group in a system to be scanned is 
locked out while scanning is temporarily stopped, that group is still 
scanned.

[Operations Common to LTR and Conventional Systems]
In both systems, any groups that are not locked out are scanned.
Transmitting while scanning and "SCAN" displayed, transmits to the 
Revert system/group.  Transmitting while Scan is temporarily stopped 
and the System/Group is displayed, activates the Talk Back function.
If a call is received and scanning is stopped, "SCAN" reappears and 
Scan restarts after the Drop Out Delay Time has elapsed from the end 
of call reception.
If a call is sent and scanning stops, "SCAN" reappears and Scan 
restarts after the Dwell Time has elapsed from the end of call 
transmission.

Note 1:  [Scan] does not operate while transmitting.
         (Fix System Scan/List Type System Scan)
Note 2:  The Revert group in a scanned system is scanned even if group 
         lockout is set to "Yes".
         (Fix System Scan/List Type System Scan)
Note 3:  In a Conventional system for which "System Lockout = No" is 
         set, a locked out Priority group is still scanned.
         (Fix System Scan/List Type System Scan)
Note 4:  At least two systems must have the "System Lockout = No" 
         specification. (Fix System Scan)
Note 5:  The System Scan List for the system that started Scan is 
         used. The Scan List does not change even if the Revert 
         system/group is changed.  Only those systems with "Scn" set 
         to "Yes" in the System Scan List will be scanned. 
         (List Type System Scan)
Note 6:  The Scan List in the system that started the Scan (the Revert 
         system) must include at least two systems that has "Scn" set 
         to "Yes". (List Type System Scan)

Revert Sys Type Help
Use this parameter to select the type of system/group to which the 
display is restored when [Scan] is used to stop scanning or to which 
a call is transmitted when [PTT] is pressed while "SCAN" is displayed.

Press [F2] or [SPACE BAR] to change from the following selections.

Last Called      : The last system/group to receive a call while 
                   scanning.
Last Used        : System/group transmitted to while scanning.
Selected+Talkback: If the system/group was changed while scanning, 
                   the newly selected system/group. The transceiver 
                   "talks back" on the current receive group.
Selected         : If the system/group was changed while scanning, 
                   the newly selected system/group.

Default          : Last Called

However, regardless of which of the above settings is used, the Revert 
system is the system/group that started the Scan until the first call 
is received or the system/group changed to (with the Up/Down key or 
the Knob control) while scanning.

Except for "Selected" :
 Transmissions while Scan is temporarily stopped (during Drop Out 
 Delay excluding Busy Channel Lockout) are always sent according to 
 the system/group currently displayed (Talk Back operation).

Revert Grp Display Help
Select Display in the scan mode.

On     : The transceiver indicates the revert group on the group 
         display in the scan mode.
Off    : The transceiver indicates "-SCAN-" on the group display 
         in the scan mode.
Default: Off

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

End Of Help File

